-- [王坤] 全局系统变量表添加默认值
INSERT INTO digital_operation.cube_global_param (type_id,param_name,param_key,param_column_type,param_type,remark,create_time,create_user_id,create_by,tenant_id,default_value) VALUES
	 (0,'当前登录用户集成用户','jhbiSysThirdUser',1,1,'当前登录用户的集成平台用户ID(ThirdUserId)','2024-04-07 14:01:34',0,'系统创建','111111',NULL),
	 (0,'当前登录用户集成岗位','jhbiSysThirdUserPost',1,1,'当前登录用户的集成平台岗位ID(ThirdPostId)','2024-04-07 14:01:34',0,'系统创建','111111',NULL),
	 (0,'当前登录用户集成部门','jhbiSysThirdUserDept',1,1,'当前登录用户的集成平台部门ID(ThirdDeptId)','2024-04-07 14:01:34',0,'系统创建','111111',NULL);

