ALTER TABLE `digital_operation`.`flow_cate`
ADD COLUMN `tenant_id` varchar(12) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '租户id' AFTER `update_time`,
DROP PRIMARY KEY,
ADD PRIMARY KEY (`id`) USING BTREE;

ALTER TABLE `digital_operation`.`flow_engine`
    ADD COLUMN `tenant_id` varchar(12) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '租户id' AFTER `notify_type`,
    DROP PRIMARY KEY,
    ADD PRIMARY KEY (`F_Id`) USING BTREE;